INSERT INTO `sys_params` VALUES (2066834685586268161, 'FILE_SCAN_ROOT_PATH', '{FILE_SACN_DIR}', 1, '气象文件扫描根路径', 1067246875800000001, '2026-06-16 18:46:04', 1067246875800000001, '2026-06-27 18:59:36');